1 EMU_UI   
 EMU user interface. This interface uses SMG.
 Through this interface the user may (depending on privs):
	1. Stop and start the system (requires syspriv)
	2. Access system monitoring and debug tools (Oper, syspriv)
	3. Query the databases	(See EMU_UILIB for detail)
	4. Generate reports
 Most of the functions under this umbrella routine are documented 
 under EMU_UILIB. 
