1 EMU_START 
 Starts the system. Running this process starts EMU_CONTROL process which
 in turn starts all other processes.
2 Inputs
 	None
2 Outputs
	EMU_CONTROL.LOG file is written in EMU5_LOG:
3 Returns
 None
