1 EMU_DISP_PROC 

 Programme to monitor the progress of the Ethernet Monitor system.
 This routine displays Process counters.

2 Counter_definitions

 Receive	Number of frames received
 Processed	Number of frames successfully processed
 Errors	Number of frmaes with error + Internal routine errors
 Returned	Number of frames returned to FREEQ
