1 DUMP_EMUDB 
 Routine to sequentialy read, format and display all recs in EMUDB
 The keys used (in order primary , secondary ....:
	BOXID, Table, Instance, Paramater
 Mostly a test/debug tool.
 Now called from Management memu in EMU_UILIB and uses SMG for output.
 
2 DBD_OOB_RECEIVE  
 This routine is called when a CTRL-C is pressed. It sets a flag to
 indicate to the main routine the user has requested exit. The main
 routine then exits orderly.
