text -1 100 This is the fire cover mini screen button.

text -1 130 When you click on this button the areas
text -1 140 that have a fire station within range are
text -1 150 dark green.

text -1 170 The areas out of range of a fire
text -1 180 station are displayed as normal.

text -1 200 Remember, fire stations take three months
text -1 210 to become active.
