text -1 100 This is the cricket cover
text -1 110 mini screen button.

text -1 140 When you click on this button the areas
text -1 150 that have cricket pitches within range
text -1 160 are dark green.

text -1 180 The areas out of range of a
text -1 190 cricket pitch are displayed as normal.

text -1 210 Remember, cricket pitches take three
text -1 220 months to become active.
