1 EXIT
Select EXIT to leave the GPLOT menu.  If no device has been selected
you will have an opportunity to redisplay the menu and select a device.

1 HPGL-File
The file GPLOT.HPGL will be created in your current directory.  You
must have write access to the current directory for the file to be
created. HPGL files can be included in some word-processing documents
or converted to other formats. 

1 HP7550
Creates file GPLOT.HP7550 in the SYS$SCRATCH: directory, then prints
the file on the HP print queue.  The Hewlett-Packard HP7550A plotter is
located in Building 399.  This plotter has a sheet-feeder and accepts
either 8.5 X 11 paper or 11 X 17 paper. 

1 LA75
Produces file GPLOT.LA75 in the current directory.  This can be printed
on a DEC LA75 printer.

1 Motif
OSF/Motif graphics using X Windows.  All GPLOT Input/Output functions
are supported.  In workstation type 231, GKS creates the window and both
input and output are supported.  If you have an X Windows terminal or
workstation and the Motif device fails, type "SHOW DISPLAY" to make sure
it is properly defined.  If not, use the "SET DISPLAY/CREATE/NODE="
command to set it. 

1 MotifW
OSF/Motif graphics using a widget created by the user.  All GPLOT
Input/Output functions are supported.  In workstation type 233, the user
creates the window and defines the logical name "MYWIDGET" which is
used by GPLOT to locate the window to be used for input and output.  If
you have an X Windows terminal or workstation and the Motif device
fails, type "SHOW DISPLAY" to make sure it is properly defined.  If not,
use the "SET DISPLAY/CREATE/NODE=" command to set it. 

1 VAXstation
VAXstation II/GPX graphics using VWS.  All GPLOT Input/Output functions
are supported. 

1 VT240
DEC Monochrome graphics terminal.  GPLOT REGIS output is sent to
SYS$OUTPUT. 

1 VT241
DEC Color graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 VT330
DEC Monochrome graphics terminal.  GPLOT REGIS output is sent to
SYS$OUTPUT. 

1 VT340
DEC Color graphics terminal.  GPLOT REGIS output is sent to SYS$OUTPUT.

1 TK4014
Produces a plot on a Tektronix 4014 terminal emulator such as the HDS
or Graphon terminals at IPNS.  The terminal is automatically switched
to and from Tektronix mode at the beginning and end of the plot.  A
programmer can switch back and forth through use of the GPUSH and GPOP
routines which push the graphics display behind or pop it in front of
the text display.  With the HDS terminal it is possible to erase areas
of the screen. 

1 TK4107
Tektronix Color graphics terminal.  Output is sent to SYS$OUTPUT.

1 TK4014-File
Produces file GPLOT.TK4014 in your current directory.  This can later
be printed on an LN03-Plus printer or other printer having Tektronix
graphics capability.  It can also be viewed on a terminal by first
setting your terminal to PASTHRU and then typing the file.  Set your
terminal to /NOPASTHRU after displaying the file. 

1 AST
The AST Printer in IPNS accelerator Operations Office by Renae Chapman
in Building 360.  A Postscript file is produced in the SYS$SCRATCH
directory and then printed on the AST queue. 

1 Postscript-File
A Postscript file named GPLOT.PS will be created in the current
directory. Postscript devices have the capability of producing any of
the built-in fonts in any size and orientation, so very high quality
text can be produced.  They also have the feature of being able to draw
in background color, allowing areas of the plot to be erased. 

1 EPS-File
An Encapsulated Postscript file named GPLOT.EPS will be created in the
current directory.  Encapsulated postscript files are Postscript files
which also contain comments giving the size of the plot.  Thus they may
be included in MASSS11 documents or other word processing documents. 

1 CEPS-File
A Color Encapsulated Postscript file named GPLOT.CEPS will be created
in the current directory.  Color Encapsulated Postscript files are
Color Postscript files which also contain comments giving the size of
the plot.  Thus they may be included in MASS11 documents or other word
processing documents. 
       
1 DP1260
Dataproducts 1260 Postscript printer in Building 360, Room L120 
A Postscript file is created in the SYS$SCRATCH directory and then
it is printed to the DP1260 queue and deleted.  
       
1 DP960
Dataproducts 960 Postscript printer in the Building 360 control room. 
A Postscript file is created in the SYS$SCRATCH directory and then
it is printed to the DP960 queue and deleted.  

1 399_LN03
Produces a TK4014 output file, then prints it on the B399-LN03 print
queue.  The LN03-Plus Printer is located in Bldg. 399.

1 399T4_LW
Produces a Postscript file in the SYS$SCRATCH directory, then prints it
on the 399T3_LW print queue.  The 399T3_LW queue goes to the Apple 
LaserWriter Printer in Building 399 trailer 4 (by Don Bohringer).

1 LWP399
Produces a Postscript file in the SYS$SCRATCH directory, then prints it
on the LWP399 print queue.  The LWP399 queue goes to the Apple
LaserWriter Plus Printer in Building 399 A137. 
 
1 NPB-LN03P
Produces a TK4014 output file and then prints it on the NPB print
queue.  The NPB LN03-Plus Printer is located in the corner of the
terminal area of the IPNS Control Room -- Building 360. 

1 LJ250
 Printer:  DEC LJ250 color ink-jet printer (90 DPI)
Location:  Building 360 Control Room, Terminal area.
Features:  256 Colors, 90 DPI resolution on paper or transparency.

1 LJ25X
 Printer:  DEC LJ250 color ink-jet printer (180 DPI)
Location:  Building 360 Control Room, Terminal area.
Features:  16 Colors, 90 DPI resolution on paper or transparency.

1 375T
Produces a TK4014 file in directory SYS$SCRATCH, then prints it on the
375T print queue.  The printer is located in the Green Trailer inside
Building 375. 

1 B223_LASER
Produces a Tektronix 4014 file in directory SYS$SCRATCH, then prints it
on the B223_LASER print queue.  The B223_laser queue goes to the
Talaris Laser Printer located in Room D214 of Building 223. 

1 DDIF-File
Produces a file in DEC DDIF (Digital Document Innterchange Format). 
This file can be viewed using the DECwindows DDIF viewer and can be
included in some documents. 

1 DECWINDOWS
Produces a window on an X windows display device running DECwindows
(not Motif) and does a plot.  This device (type 211) supports both
input and output. 

1 DECWIDGET
Produces a plot in a previously created DECwindows Widget.

1 CGM-Metafile
Produces a Computer Graphics Metafile (CGM).  Currently these files are
not supported for input to DEC GKS.  They also are not much use
elsewhere because their 512 Byte record length prevents them from being
compatible with DISSPLA, for instance. 

1 GKS-Metafile
Produces a GKS metafile which can be plotted using the POSTGKS command.
GKS metafiles can be edited using the EVE editor.  They are a record of
GKS instructions used to create a plot.  See the DEC GKS documentation
for an explanation of the various metafile codes. 

1 WISS
Workstation Independent Segment Storage (WISS) may be used to save the
plot frame in memory so it can be transferred to a hardcopy device when
the plot frame is completed.  If WISS is open, subroutine ENDPL will
ask if you want to make a hardcopy plot of that frame. 

