1) Your full name is inserted into the headers of mail messages you
   send out.  It is also displayed by anyone using the finger utility
   to find out who you are.  Use of most special characters and some 
   punctuation characters in your name is prohibited.  After your account
   has been created you can change this field with the "chfn" command.

2) The logon name you choose will be the name that you use to log in to
   the system.  It will also be the name used by the mail system to
   identify you and the name of your home directory.  Your logon name
   can be up to eight letters or digits starting with a letter and
   should be all in lower case.  Please refrain from using obscene or
   otherwise questionable words.

3) Your office, phone and home phone settings are optional.  They will
   be displayed by anyone using the finger utility.  You can put whatever
   information you want people to know about you. 

4) Your office, phone and home phone settings are optional.  They will
   be displayed by anyone using the finger utility.  You can put whatever
   information you want people to know about you. 

5) Your office, phone and home phone settings are optional.  They will
   be displayed by anyone using the finger utility.  You can put whatever
   information you want people to know about you. 

6) The mail address you specify with option 6 will show up in the "From"
   field in electronic mail that you send out.  This mail address will 
   be used by your colleagues to get mail back to you.  It is suggested 
   that this not include the name of a computer since that will save you
   the trouble of informing everyone should you decide to read mail on a
   different computer in the future (eg:  if this computer is replaced).
   You can choose one of three options:  

       1) logon@u.washington.edu
       2) logon@host.u.washington.edu
       3) logon@other.washington.edu

   where "host" is the name of this computer and "logon" is the logon 
   name you've chosen.  Mail sent to logon@u.washington.edu will be 
   forwarded to the address specified by option '7'.  If you choose to 
   have your mail look like it came from another "department" with third
   format above, you should verify that mail sent to that address will 
   be forwarded to a proper place.  This setting can be changed at a 
   later date by editing your .login file and changing the "FROM" 
   environment variable.  

7) All mail sent to logon@u.washington.edu will be forwarded to the
   address you specify with option '7'.  Please be sure that this is a
   address you specify with option '7'.  Please be sure that this is a
   valid electronic mail address and that no mailing loops will result.
   You can change this forwarding address at a later date with the
   "fmail" command.

Q) The "Q" option is used to terminate the dialog without creating an account.

