1 FORCEX

 Terminates execution of an image in another process.

 Format:

   FORCEX [process-name]

 Note: Using FORCEX on a process not currently running an image will cause
 the next image to exit immediatly.
 
2 Parameters

 process-name

 Specifies the name of the process to be acted upon. The process name can
 have from 1 to 15 aphanumeric characters.  The specified process must be
 in your UIC group.  To force exit a process outside your UIC group, you
 must use the /IDENTIFICATION=pid qualifier.
 
2 Qualifiers
/IDENTIFICATION

 /IDENTIFICATION=pid

 Specifices the process identification code (PID) that the system has
 assigned to the process.  You can omit any leading zeros in specifying the
 PID.

/STATUS

 /STATUS=statuscode

 Specifies the exit status code to be passed to the process.  This status
 code will be available to the exit handlers of the image executing in the
 process.

 The default is SS$_OPRABORT, "Aborted by Operator".
 
2 Author

 Please direct any bug reports, complaints or praises to:

 
 +-------------------------+-------------------------------------+
 |M. Erik Husby            | I live the life I love              |
 |Member, Technical Staff  | And I love the life I live. W.Dixon |
 +-------------------------+-------------------------------------+
 |Access Technology, Inc.  | Voice:    (508)655-9191             |
 |2 Natick Executive Park  | FAX:      (508)655-7772             |
 |Natick, MA 01760         | EasyPlex: 70003,5200                |
 |                         | Internet: 70003.5200@compuserve.com |
 |                         | DECUServe: EISNER::HUSBY            |
 +-------------------------+-------------------------------------+

