1 NET
	A utility that allows the user to show selected network information
sorted as the user wants and displayed in a condensed manner. The syntax
of the command is:

$ NET [sort_parameter] [/REVERSE] [/DISPLAY=(display_option_list)]

2 sort_parameter
	The user selects which network data item that he wants to sort
by before displaying it on the screen. The parameters are:

	NAME		node name	(DEFAULT)
	NUMBER		node address
	HOPS		number of hops to node
	COST		cost to node
	LINK		number of links between current host and node
	NEXT_NAME	name of next node in path to destination node
	NEXT_NUMBER	address of next node in path to destination node

only one sort parameter can be specified. If no sort parameter is specified,
NAME is assumed.

2 /REVERSE
	Reverses the order that the data is displayed on the screen

2 /DISPLAY=(display_option_list)
	Overides the default items displayed on the screen.

3 default
	When the /DISPLAY switch is not used, the items displayed 
depend on what the current sort parameter is.

	Sort Parameter	Default Display items

	NAME		NAME,NUMBER
	NUMBER		NAME,NUMBER
	HOPS		NAME,NUMBER,HOPS
	LINK		NAME,NUMBER,LINK
	COST		NAME,NUMBER,COST
	LINE		NAME,NUMBER,LINE
	NEXT_NAME	NAME,NUMBER,NEXT_NAME,NEXT_NUMBER
	NEXT_NUMBER	NAME,NUMBER,NEXT_NAME,NEXT_NUMBER

3 display_option_list
	If the /DISPLAY switch is used, the default display items are
not shown, rather only those items explicitly shown  in the 
display_option_list will be displayed. If the sort item is not shown in 
the list, it will not be displayed. Items that can appear in the display 
list are as follows:

	FULL		Show all data items about each active node.
			Cannot be used with any other item in the display
			option list.
	BRIEF		Show only NAME and NUMBER of each active node.
			Cannot be used with any other item in the display
			option list.
	NAME		Show the name of each active node.
	NUMBER		Show the address of each active node.
	HOPS		Show the number of hops to each active node.
	LINK		Show the number of links between the current host
			and each active node.
	COST		Show the cost between the current host and each 
			active node
	LINE		Show the line used to send Decnet messages from
			the current host and each active node.
	NEXT_NAME	Show the name of the next host in the path from the
			current host to each active node.
	NEXT_NUMBER	Show the address of the next host in the path from the
			current host to each active node.
2 EXAMPLES

	$ NET
		Basic display of active nodes and addresses

	$ NET HOPS/REVERSE

		Display a list of active nodes, address and hops to each,
		sorted by hops and displayed in order of most hops to least
		hops.

	$ NET line/display=(name,line,next_name)

		Display a list of active nodes, the line to that node and
		the next node in the path to that node, sorted by line name.

	$ net/display=full

		Display a list of all information about all the active
		nodes, sorted by node name.
