1 IMC
  The Idle-Monitor Control program is used to communicate with the
  Idle-Monitor program.

  Format:

    IMC command

2 DISABLE
  The DISABLE command directs Idle-Monitor to disable a feature.

  Format:

    DISABLE option

3 OPCOM_LOGGING
  Directs Idle-Monitor to disable the logging of process terminations
  to OPCOM.  This command overrides the setting of IDLE_MONITOR_FLAGS.
  Use of this option requires OPER privilege.

2 ENABLE
  The ENABLE command directs Idle-Monitor to enable a feature.

  Format:

    ENABLE option

3 OPCOM_LOGGING
  Directs Idle-Monitor to enable the logging of process terminations
  to OPCOM.  This command overrides the setting of IDLE_MONITOR_FLAGS.
  Use of this option requires OPER privilege.

2 LOAD
  The LOAD command directs Idle-Monitor to load data into it's internal
  database.

  Format:

    LOAD option

3 IGNORE_LIST
  Directs Idle-Monitor to reload it's list of objects to be ignored.
  Use of this option requires OPER privilege.

2 SHOW
  Directs Idle-Monitor to display information about it's internal database.

  Format:

    SHOW option

3 IGNORE_LIST
  Directs Idle-Monitor to display the list of objects on the Ignored
  Objects list.  Use of this option requires OPER privilege.

3 MONITORED_LIST
  Directs Idle-Monitor to display the list of processes that are being
  monitored.

3 WARNING_QUEUE
  Directs Idle-Monitor to display the list of processes that are on
  the Warning Queue and in danger of being terminated.

2 ZERO
  Directs Idle-Monitor to zero the idle time for a specified process in
  it's internal database.  Use of this command requires OPER privilege.

  Format:

    ZERO pid
