1 SETUP

 SETUP is a utility that sets up certain environmental items  (logical
 names, symbols, etc.) for use with an application.

 Format:

 $ SETUP application

 The "application" is the name of the application you want to set up.
2 Qualifiers
/FULL

 /FULL

 The  /FULL  qualifier  is  used  with  /LIST  to  display  additional
 information about applications available for setup.
/INITIAL

 /INITIAL

 The /INITIAL qualifier is used to invoke the specified  application's
 one-time initialization setup.
/LIST

 /LIST

 The /LIST qualifier is used to display  information  about  available
 application  setups.   The  "application"  parameter  can  be used to
 specify a wildcard pattern.  Any application  names  that  match  the
 pattern  are  displayed.   The  default  is  to  list  all  available
 applications.
2 Examples

 $ SETUP EAGLES

 Sets up the EAGLES/M application.

 $ SETUP WPSPLUS/INITIAL

 Performs the one-time initial setup for WPS-Plus.

 $ SETUP/LIST W*

 Displays the names of all applications beginning with the letter  "w"
 that can be set up through the SETUP command.
