Zmodem is faster then the Xmodem and Ymodem, but only long distance callers
and PC Pursuiters will really appreciate the speed difference.
These are the BAT files that I have setup for Qmodem 3.1 Downloading
and Upload for the Zmodem Protocal.  The ones given with Qmodem files
are correct, but I have modified them slightly.
RZ.BAT    -  Notice I have Zmodem put the file into the
	     D:\DOWNLOAD  directory.
	     Yes, you have to put it  /  instead  \  for paths.  Qmodem
	     Default has it will put it in the Currently Active Path.
SZ.BAT    -  I have also altered SZ.BAT as shown below.
   
Notice that since you are using external protocals, your computer does
not do the BEEP-BEEP-BEEP after the transfer.  I have added to SZ.bAT
and RZ.BAT, the command  BEEP  (from Norton Utilities) onto the end
of the Batch files so that it will do the BEEP for me.
   
   
Receive (Download) Batch File    RZ.BAT  contains:
ECHO OFF
DSZ port %2 speed %1 rz D:/DOWNLOAD
BEEP
BEEP
BEEP
   
Send (Upload) Batch File         SZ.BAT  contains:
ECHO OFF
DSZ port %2 speed %1 sz %3
BEEP
BEEP
BEEP
