1 2CL
 Two-Column Lister

       2CL input-file-name [/qualifiers]
 
 The Two-Column Lister will copy an ASCII file into a file having
 two columns, formatted for printing on any LN03 printer. The
 output file name gets a default file type of .2CL. 

 By default, the input file is truncated at 83 characters, and
 tabs are expanded to spaces by normal conventions. 
2 Input-File-Name
 The name of the ASCII file which is to be copied into a
 Two-Column format.  Lines of the input file should not exceed 133
 characters, and will be truncated to 83 characters unless /WRAP
 is specified. 
2 Command_Qualifiers
 /FTAB_EXPAND
 /NOFTAB_EXPAND (D)

 If this quilifier is positive, tab characters in the input file
 will be expanded according to the manner in which the Fortran
 compiler will interpret them.  By default, tab characters will be
 expanded "every eight". 


 /OUTPUT=file-name

 The output file may be named explicitly by means of this qualifier.


 /WRAP 
 /NOWRAP (D)

 If this qualifier is positive, a line which exceeds 83 characters
 (up to 133 characters) will be continued on the following line.
 The continuation line is flagged with the characters "==wrap==". 

2 /FTAB_EXPAND
 /FTAB_EXPAND
 /NOFTAB_EXPAND (D)

 If this quilifier is positive, tab characters in the input file
 will be expanded according to the manner in which the Fortran
 compiler will interpret them.  By default, tab characters will be
 expanded "every eight". 
2 /OUTPUT

 /OUTPUT=file-name

 The output file may be named explicitly by means of this
 qualifier. The default extension is .2CL
 
2 /WRAP 
 
 /WRAP 
 /NOWRAP (D) 

 If this qualifier is positive, a line which exceeds 83 characters
 (up to 133 characters) will be continued on the following line.
 The continuation line is flagged with the characters "==wrap==". 
