1 TYMNET
Incoming connections are available from TYMNET to the Fermilab Central
Computing Facility's port selector.  Log into TYMNET using your personal
account and password, then specify the Fermilab address (known as the
X.121 address, or DNIC DTE), which is 3106005622.
