1 PRINTER
The VAX Cluster printer is located with the other Central Computer
Facility Printers on the seventh floor of Wilson Hall.  Output is sorted
and binned by the operators, based on the last two digits of your
Fermilab ID number. The present default printer is an 800 line per
minute Printronix dot-matrix printer. 

Talaris laser printers are available for text and graphics printing on
letter size paper.  Print queues are assigned names by the geographic
location of the printer.  The WH7W_PRINT 24 page per minute printer is
serviced by the operators, with output placed in the normal printer output
bins.

Files may be routed for printing between the Cyber and VAX central
facility systems using the PRINT function of the NET command. 
