1 NOVICE
		Welcome to the VAX/VMS system! 

To exit HELP, type control-Z.

For help with the HELP command, exit help and enter HELP HELP.

Several alternate help libraries are available, as listed at the end
of the menu obtained by typing HELP.

The  HELPLIB  library is the standard DEC help library, the default for HELP.

The  FERMIHELP  library describes non DEC products installed on this machine.

The  USERGUIDE  library is an online version of the VAX chapter of the
Fermilab Central Computing Facility Users Guide.  This NOVICE item is one of
several items available in  USERGUIDE.  Type  HELP @USERGUIDE  at the command
level to see the USERGUIDE topics. 
