1 LOGIN
The Vax Cluster is accessed through code VC on the Fermilab port
selector. Enter one carriage return after you receive the GO prompt. You
will be prompted for your username and password.  If you have received
any mail or network files, you will be automatically informed at login. 

The Cluster is nodes FNAL, FNALA, FNALB, FNALC, CDF, or CDFSFT  on both
BITNET and the High Energy Physics DECnet network.  You may start an
interactive session by issuing the SET HOST command when logged into any
other machine on the DECnet network. There is a substantial network
overhead, so you should expect some sluggishness in screen displays
during such remote sessions. 

The standard command for logging off the Vax is LOGOFF.  If a LOGOUT.COM
file is present, it will be executed at logoff. At Fermilab, for the
convenience of Cyber users, we have also defined a BYE command for
logging off. 

The program ARGUS inspects all timesharing lines, and logs out users who
have been idle for thirty minutes, giving warnings every ten minutes.
The port selector hardware disconnects dial-in lines showing no activity
for fifteen minutes. 
