1 LIBRARY
Fermilab supported programs, procedures and load libraries are contained
under the LIB:[LIB] directory.  They should be named using the logical
name LIB: rather than the corresponding physical disk name. The history
of any product, and all support information and programs are contained
under the appropriate subdirectory of the LIB account, 
    LIB:[LIB.product] 

Program usage :

$ RUN LIB:[LIB.product]program.EXE
    To run a program

$ @LIB:[LIB.product]procedure.COM
    To execute a procedure

$ LINK  ...,LIB:[LIB.product]product.OLB/LIBRARY,...
    To link with a library

LIB:[LIB.WRITEUP.IV]IV2.MEM describes Fermilab product maintenance standards. 
