1 GRIPE
Suggestions, constuctive criticism, and gripes regarding the Fermilab
Central Computing Facility, and the VAX Cluster in particular, should be
directed to user [GRIPE] in the form of MAIL messages. Please use this
mechanism to record gripes concerning any matter, whether it be a
problem with system performance, policy, application software, or
hardware. The GRIPE mail box will be checked regularly by members of the
Computing Department staff. They will forward each item for handling by
the appropriate person or persons, and each item will receive a response
by VAX MAIL. 
