1 SETUP
 Product SETUP procedures perform initialization necessary for product use.
  Usage:    SETUP  product
            SETUP  product1,product2,......,productn
  Action:   Executes    LIB:[LIB.product]SETUP.COM
                     or SITE_PRODUCTS$ROOT:PRODUCT_SETUP "product"
                     or product$COMMANDS:SETUP.COM
                     or product_COMMANDS:SETUP.COM
 These are the standard user Setup interfaces for Fermilab supported products.
 SETUP does not replace these standards, but attempts to provide a convenient
 interface for interactive users. 
2 USER_PRODUCTS
 You may use the SETUP procedure for your own products by defining a logical
 name of the form   product_COMMANDS  , which should translate to a
 directory containing the product's SETUP procedure. For example :

 $ DEFINE  PRODUCT2_COMMANDS   USR$ROOT:[MYSELF.PRODUCT2]

 and place an appropriate SETUP.COM procedure in that directory.
2 VERSIONS
 For LIB directory products, the product name is actually the name of the
 LIB subdirectory containing the SETUP procedure.  Alternate versions are
 therefore set up by giving the alternate directory name. A product.TEST 
 directory is commonly used for a product's test version, for example.

 For Bison products, each name may be followed by a qualifier of the form

 /CONNECT or /DEVELOPMENT or /V=version
2 PARAMETERS
 When multiple products are set up, you may include any optional parameters
 for a product setup by appending a qualifier of the form

     /PAR="...."

 to the product name.  As usual, any quotation marks to be included in
 the parameters string must be doubled.

 When a single product is being set up, you have the option of placing
 any required parameters after the product name, simply separated by blanks.
 This option is not available when up more than one product is set up by a
 single SETUP statement.
