1 NET
The NET program provides file transfer, file printing and job submission
between mainframes of the Fermilab central facility. On the Cyber
system, you must  GET,NET/UN=PRLIB  before using NET. You will be
prompted for any omitted parameters. The function and file parameters
may be followed by optional  qualifiers. Any qualifiers not processed by
NET are appended to the appropriate batch job command. You may use these
qualifiers to specify such things as alternate user names, file
protection, print file routing, or batch job queues. 

Note that on the Cyber, a period must separate any parameters from NET.

VAX >    NET function file remotefile node account password
CDC >    NET.function file remotefile node account password

_________________    PARAMETERS and QUALIFIERS   _________________________

  function   - MAIL, PRINT, RECEIVE, SEND, or SUBMIT
                 /DISPLAY  - (default) Translate to/from Cyber display code 
                 /ASCII    - Translate to/from Cyber 8/12 ASCII code 
                 /BIT      - direct binary transfer
                 /DEBUG    - Full session messages, dayfile in Cyber WAIT queue
  localfile  - Name of the permanent file to mail/print/send/receive/submit
                 /SAVE(default),/REPLACE,/DEFINE,/PURGE
                 /GET(default),/ATTACH
                           - apply specified action(s) to Cyber file
  remotefile - Remote file name (User for MAIL, dummy for PRINT, SUBMIT)
                 Qualifiers are the same as for localfile, described above
  node       - Name of the remote node, CDC for Cyber,  VAX for Vax Cluster
  account    - Username for your remote node batch job.
  password   - Password of the remote account.

_______________________  E X A M P L E S  ________________________________

     ( For example, username E100, password ABROHAT on VAX or Cyber )

     * *  Copy from user E100's file MYPROG on Cyber to file MYPROG.FOR on VAX
VAX> NET  REC  MYPROG.FOR  MYPROG  CDC  E100  ABROHAT
     * *  Print VAX file MYFILE.LIS on TC=2 printer, upper and lower case.
VAX> NET  PRINT/ASCII,TC=2,EC=A9  MYFILE.LIS  DUM  CDC  E100  ABROHAT
     * *  Submit a low priority batch to the Cyber system, output in WAIT queue
VAX> NET  SUBMIT/TO  BITJOB.CDC  DUMMY  CDC  E100  ABROHAT
     * *  Send E103's direct access file MYPROG to user E100 on VAX
CDC> NET.SEND  MYPROG/UN=E103/ATTACH  MYPROG.FOR  VAX  E100  ABROHAT
__________________________________________________________________________

Net operates by submitting batch jobs on both the local and remote
systems. Your Cyber account must have a default charge code. On the VAX,
the batch job generates a NET.LOG log file in your USR$SCRATCH root
directory. The Cyber batch job dayfile will be printed unless the /DEBUG
function qualifier is specified. If a transfer fails, look in the batch
job output for diagnostic messages. 

Procedure LIB:[LIB]SIX12.COM may be used  on the VAX to convert files
between ASCII and Cyber 6/12 ASCII encoding.
