2 COLORS
 The following is the set of commands that allow a user to manage the
 color settings used on REGIS terminals (VT241's). These commands must
 be used to set up and/or change colors. 

3 CO
 This command will do the following:
  1. If the user has a DID_COLORS.BEFORE, Go To Step 3.
		ELSE
  2. Execute the user's SET_COLORS.COM if it exists. It will pass all
     8 parameters to SET_COLORS.COM. This allows the user to have up
     to 8 different color settings, i.e. CO 4 would pass the parameter
     4 to the user's SET_COLORS.COM which could then type color file 4.
                ELSE
  3. Type SYS$LOGIN:CURRENT_COLORS_CMD.SCR if it exists. This file is
     created by the NCO, CCO, PCO or XCO commands. This sets up the
     default color scheme for a user.
		ELSE
  4. Type SYS$UTILS:[COLORS.MANAGER]SYSTEM_DEFAULT_COLORS.SCR. This is
     the system default color setting.

3 OCO
 (Old Colors)
 This command will reset the terminal parameters to clean up "GARBAGE"
 and set the user's default colors, or the system default colors.

3 NCO
 (New Colors)
 This command will set up a random color setting. The colors picked are
 usually reasonable. The colors that are chosen will become the new 
 default so you should save the old setting before executing this command
 if you want the previous setting saved. The current colors are always in
 SYS$LOGIN:CURRENT_COLORS_CMD.SCR.

3 CCO
 (Complementary Colors)
 This command will set up a random complementary color setting.
 The colors picked are usually reasonable. The colors that are chosen
 will become the new default so you should save the old setting before 
 executing this command if you want the previous setting saved.
 The current colors are always in SYS$LOGIN:CURRENT_COLORS_CMD.SCR.
 
3 PCO
 (Pick Colors)
 This command will enable a user to interactively set up his default color
 setting. The colors that are chosen will become the new default so you
 should save the old setting before executing this command if you want
 the previous setting saved. The current colors are always in
 SYS$LOGIN:CURRENT_COLORS_CMD.SCR.

3 XCO
 (X_Change Colors)
 Like PCO, but different user interface.

 This command will enable a user to interactively set up his default color
 setting. The colors that are chosen will become the new default so you
 should save the old setting before executing this command if you want
 the previous setting saved. The current colors are always in
 SYS$LOGIN:CURRENT_COLORS_CMD.SCR.

