<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">
             Queue                     Monitor Slice          Critical User Load
             -----                     ------- -----          -------- ---- ----
          LONG$BATCH                  0000 00:10:00.00                22
           SYS$BATCH                  0000 00:10:00.00                38</pre></body></html>