1 STATUS

/DISPLAY
	/DISPLAY=(item[,item...])

	Where item is any one of the items from the SYS$GETJPI system service
	as follows:

	 ACCOUNT,APTCNT,ASTACT,ASTCNT,,ASTEN,ASTLM,AUTHPRI,AUTHPRIV,
	 BIOCNT,BIOLM,BUFIO,BYTCNT,BYTLM,CLINAME,CPULIM,CPUTIM,CREPRC_FLAGS,
	 CURPRIV,DFPFC,DFWSCNT,DIOCNT,DIOLM,DIRIO,EFCS,EFCU,EFWM,ENQCNT,
	 ENQLM,EXCVEC,FILCNT,FILLM,FINALEXC,FREP0VA,FREP1VA,FREPTECNT,
	 GPGCNT,GRP,IMAGECOUNT,IMAGNAME,IMAGPRIV,JOBPRCCNT,JOBTYPE,LOGINTIM,
	 MASTER_PID,MAXDETACH,MAXJOBS,MEM,MODE,MSGMASK,OWNER,PAGEFLTS,
	 PAGFILCNT,PAGFILLOC,PGFLQUOTA,PHDFLAGS,PID,PPGCNT,PRCCNT,PRCLM,
	 PRCNAM,PRI,PRIB,PROCPRIV,PROC_INDEX,SHRFILLM,SITESPEC,STATE,STS,
	 SWPFILLOC,TABLENAME,TERMINAL,TMBU,TQCNT,TQLM,UAF_FLAGS,UIC,USERNAME,
	 VIRTPEAK,VOLUMES,WSAUTH,WSAUTHEXT,WSEXTENT,WSPEAK,WSQUOTA,WSSIZE

/FAO_CONTROL
	/FAO_CONTROL=string

	'String' is an fao control string used to format the display.
	Note that all items on the display should be displayed via the !AD
	function, and that you will need one for each item on the display
	list.

	i.e.
	 STATUS/DISPLAY=(Username,Prcnam)/Fao="Username=!12AD, processname=!AD"
/FILE
	/FILE=file-spec

	For very wordy displays, this allows a very large fao control string	
	to be contained in a file. Note, for each new line in the file, a !/
	is appended to the actual control string.
/PAGE
	/PAGE[=cycle-type]
		where cycle-type is one of the following
		(default = page)
	PAGE	= clear display after every 24 lines
	USER	= clear display after displaying each user
	CYCLE	= clear display after cycing through all users
/REPEAT
	/REPEAT[=interval]
	Cycle through display every 'interval' seconds
/SORT
	/[NO]SORT=(item[,item...])
	Allows up to an 80 character field to be used to sort the display.
	Processes are display in ascending order, according to the information
	in this field. See /DISPLAY for a list of valid items.
/WAIT
	/WAIT
	Wait for a carriage return before going on at end of
	display cycle (see /PAGE).
