1	SETUIC<	SETUIC allows users to display their current UIC and if the@	user has GROUP, WORLD, or SYSPRV privilege to change their UIC.?	If the user has GROUP privilege, the UIC may be changed withinnA	the group.  If the user has WORLD privilege, the user may changee>	both group and member number provided the group is > a preset?	minimum value (currently set at 311).  If the user has SYSPRV,r	any UIC is legal.7	SETUIC is defined in SYSLOGIN.COM as a FOREIGN commandr&		SETUIC:==$SYS$SYSDISK:[SYSUTL]SETUICC	and is installed with CMKRNL privilege during sysboot so all users 	can use it.$		SETUIC	           ->  Displays UIC0		SETUIC [ggg,mmm]   ->  Change UIC to [ggg,mmm]0		SETUIC  ggg,mmm    ->  Change UIC to [ggg,mmm]2	SOURCE_LOCATIONC	Found on [SYSUTL] directory.o