1 NEWTOOL
  Create instance of a new tools main program.  This is used to create a
  template file for a the main module (Pascal PROGRAM, C main, etc) for
  the named tool.

	$ NEWTOOL	tool-name	language

  Parameters
	tool-name	Name of program.  Enclose in double quotes (") to
			retain case (important for C ).

	language	Programming language (Pascal, C).
2 File_Name
  This will reduce the tool-name to a 9-character VMS file name (file-name),
  and create the source file (file-name.type) that is to be compiled, to
  create and executable (.EXE) file.

	Language	type
	-------------	-------
	Pascal		PAS
	C		C
2 Input_Output_Files
  The environment of the main PROGRAM will define a standard I/O files that
  are to be used for all input and output, in a manner similar to Unix, and
  the C programming laguage.

	Standard Input		Input		StdIn
	Standard Output		Ouput		StdOut
	Standard Error		Error		StdError
