1 CLINK
  Used to link a C program, that is to be using any of the C Primitives,
  that are in the C_PRIMS directory.

	$ CLINK  name [lib-1 lib-2 ... lib-7]

  Parameters
	name		- File spec (type omitted) for input object file and
			  output executable file.
	lib-i		- File name (no type, no directory) of object library
			  (or libraries up to 7) in C_PRIMS.
			  Default is CPRIMS.
  Supplier
	D. Amby,	Send mail to AMBY for problems/comments.
