1 WPPRINT
  Print file out on DECmate II wordprocssing systems.

	$ WPPRINT file is_mem lines_down space_right page_size width

  Parameters							(default)
	file		- File name to print.
	is_mem		- YES for *.MEM file, NO otherwise.	(NO)
	lines_down	- Lines down from top of page.		(0)
	space_right	- Spaces to right.			(0)
	page_size	- Length of page, lines.		(56)
	width		- Width of line, characters.		(70)

  Supplier
	D. Amby,	send mail to AMBY for problems/comments.
