1 WHOAMI
  Used to specify the current USERNAME and UIC, and writes message
  indicating each.

	$ WHOAMI

  There are no parameters, as all information is determined from the
  current process information.  If the current username is AMBY and
  the UIC is [AMBY], then the following will be written.

	you are AMBY, with UIC of [AMBY]

  Supplier
	D. Amby,	send mail to AMBY for comments/problems.
