1 WHEREAMI
  Used to specify what VAX you are logged onto, the terminal line, and
  the default directory.

	$ WHEREAMI

  There are no parameters, as all information is determined from the
  current process information.  If the user is on node NODE using
  terminal TXxx:, in directory MY_DISK:[dir], then the following will
  be output.

	node NODE::, terminal TXxx:, directory MY_DISK:[dir]

  Supplier
	D. Amby,	send mail to AMBY for comments/problems.
