1 LOGIN

 This command procedure emulates the standard VMS login sequence to get
 a username and password that are defined as global symbols, to be used
 by several other utilities.

 Format :

	$ LOGIN

 Global Symbols Set :

	USERNAME	PASSWORD

  Supplier
	D. Amby, so send mail to AMBY if you have problems/comments.
