1 LA100SET

General user interface to allow users to set the characteristics of the LA100
printer, that is on VAX B.  This can be used to set up the printer for either
DRAFT (default) or LETTER mode.

Format :

	$ LA100SET	[quality]

Parameters :

	quality		- Optional, print quality (DRAFT or LETTER).


  Supplier
	D. Amby, so send mail to AMBY if you have problems/comments.
