1 LA100PRT

This can be used to print files to the LA100 printer, that is presently on
VAX B, from either VAX A or B.

Format :

	$ LA100PRT ["/switches"] print_file

Parameters :

	Switches	- Optional, PRINT command qualifiers, to be applied.
	Print_File	- Required, specification of file(s) to print.
			  Wild cards ok, but not list of files.

  Supplier
	D. Amby, so send mail to AMBY if you have problems/comments.
