1 DEFDIR

  Generates a local (LOC_DIR) and remote (REM_DIR) logical name, that can
  be used to point to a directory on present or remote system.  This uses
  the current values of the global symbols USERNAME and PASSWORD, in
  constructing the value of REM_DIR.

	$ DEFDIR [dir_name] [node_name]

  Parameters :
	dir_name	- Directory specification 
	node		- Remote DECnet node name

  Logical Names Assigned :
	LOC_DIR		- Points to local directory.
	REM_DIR		- Complete DECnet remote directory access string.

  Supplier
	D. Amby,	send mail to AMBY if you have problems/comments.
