1 DCLTIME
  Time how long a DCL command takes to execute, by indicating the starting
  time and ending time.

	$ DCLTIME "command"

  Parameters
	command		- DCL command that is to be run, and timed.

  Supplier
	D. Amby,	send mail to AMBY for comments/questions/problems.
