1 LOG
  This is used to log a one-line description in a personal work log file, that
  is pointed to by the logical name MY_WORK_LOG.  If the logical name does not
  exist, this will define it to be SYS$LOGIN:username.WRK, where username is
  your username.  You will be prompted to enter one line of information that
  will be written to the log file, along with a date and time stamp.

	$ LOG

  Parameters
	none.

  Supplier
	D. Amby,	send mail to AMBY for problems/comments.
