1 WHO
Allows a user to find the UIC, default device and default directory for
a given username on all nodes.

Format:

	WHO username
2 Parameters
username

Specifies the username to be searched for. The username specified can
be complete or a subset such as the following:

WHO te

This will display all occurances of usernames starting with te.
NO wildcard specifications are allowed in the username.


2 Qualifiers

/UIC=

Allows a search by specifying the UIC instead of the username. The UIC
value must follow the standard VMS UIC format of [###,###] but no 
leading zeros are necessary.

Wildcard searches are allowed on either the group number or member number.
Such as:

WHO/UIC=[20,*]  which will find all occurances of a group number of 20
on all nodes.

or

WHO/UIC=[*,20] which will find all occurances of a member number of 20
on all nodes.

The /UIC qualifier cannot be used with a username specified.
