.np
.rm 72
.m2 0
This command types the file(s) specified by "file-spec" a page
at a time to the user's terminal.
If "file-spec" is omitted, the remembered file will be typed.
At the end of each page typed, the user is prompted with ":".
Valid responses are:
.sp
.nf
.in +2
Q - Quit typing the file     ? - Show name of file          H  - Help
/ - Skip past next page      = - Show current line number
.in -2
.fi
.sp
Any other response will continue with the next page.
.sp
Multiple files can be typed
by specifying a list of names separated by commas
or using wildcard characters ("*").
Each file typed is preceded by a file-name title.
The following are command options:
.sp
.nf
 -PAGELEN:n - (or "-P") set page length to "n" lines; default is 22
 -WIDTH:n   - (or "-W") set page width to "n" columns; default is 135
 -NUMBER    - (or "-N") show line numbers with each line
 -TRANSLATE - (or "-T") bypass translation of non-printable characters
 -READ      - (or "-R") suppress file-name title; file is read as text
.br
.fi
