.np
.rm 72
.m2 0
With no options specified, this command processes a FLECS input
file "file-spec", generates the executable file (.EXE) replacing
any current .EXE file(s), and deletes the
intermediate .LIS, .FOR & .OBJ files.
The command is terminated if a FLECS, FORTRAN, or LINK error
occurs.
.sp
     This command has options to:  LINK only, DELETE intermediate
files only, or FLX/FORTRAN/LINK without DELETE.
Valid options are:
.sp
.nf
  -NODEL     - (or "-N") Do not delete .LIS, .FOR or .OBJ file.
  -DELETE    - (or "-D") Perform only deletion of .LIS,.FOR,.OBJ files.
  -LINK      - (or "-L") Link .OBJ file replacing current .EXE file(s).
  -EFFICIENT - (or "-E:opt") Link for efficiency, or with given "opt"
.fi
.sp
All parameters may be entered in any order.
