1 DEL2ABS
  MEC$USER:DEL2ABS.EXE Converts a time in system delta time format to 
 an absolute time returning the value to a global symbol specified by 
 the caller in the command line.  The program should be executed as a 
 foreign command, so there is a   command procedure 
 MEC$USER:DEL2ABS.COM which will do this   automatically. 

 The two parameters are: 

    P1 -- Global Symbol to receive the target time as its value

    P2 -- Delta time in format [d ] [hh]:[mm]:[ss][.hh]

 If the procedure is to be executed from another   procedure, P2 should
 be enclosed in quotes if a value is   specified in the day field. 

