CP/M-86 8088-based "native" Rainbow KERMIT (Oct 21, 1983)

The new 8088-based Rainbow KERMIT is a preliminary version -- that means it's
not yet finished.  It has the following restrictions:

. Runs under CP/M-86/80 version 1 only.  Not version 2 or MS DOS.
. Tested at 4800 baud and keeps up OK.  9600 baud uncertain.
. No wildcard SEND yet.
. Some server commands are supported, but not GET (yet).
. There is code to keep DTR up, but it has not been tested.
. There may be rough edges and bugs here and there.

There's no .HEX file, only a binary .CMD file.  You should be able to
download it using the old KERMIT on the Z80 side.  The program is stored
in the distribution area as RB*.*.  RBKERMIT.CMD is the executable program.
RB*.A86 are the source modules, written in Digital Research CP/M-88 assembler
and assembled on the Rainbow.

Written by Bill Catchings.
