2 FILE
 Produces a list of files broken down by  owning  UIC.  This  list  in-
 cludes  a  complete  filename specification and a tally of blocks both
 allocated and used.

 Format:

      SHOW FILE/OWNER_UIC=uic_specification device_name
3 Parameters
 device_name[:]
 This required  parameter  identifies  the  disk  or  disks  to  be
 searched  and may be specified as either a physical device such as
 _DBA0: or a logical equivalent name like SYS$SYSDEVICE.   Multiple
 device names are separated by commas.
3 Qualifiers
/OUTPUT=file_specification
 This  qualifier  specifies  where output from this utility will be
 directed;  by  default  all output goes to SYS$OUTPUT. Output con-
 sists of 66 line pages unless the output device is a VT100  termi-
 al.  On  VT100 terminals output is split into screens of 24 lines;
 unless the /NOPAUSE qualifier is used, a carriage return  must  be
 entered to display a new screen.
/OWNER=uic_specification
 This  required  qualifier specifies the UIC for which a search will
 be  conducted  and  must  conform  to  the  standard VAX uic format
 (eg  [200,200]  or [10,*]).  Wild  cards are permitted for both the
 group and member portions of a UIC.
/PAUSE

  PAUSE
  NOPAUSE

 This qualifier affects output paging only when the output device is
 a VT100 terminal. The default PAUSE qualifier requires that a  car-
 riage return be entered between screens of information.
