!Micro-debugger Help File	Rev 2.0, April 13, 1982
!To stop printing, type ^C
!
! DEBUGGER commands (all terminated by carriage return)
!
! 'E/P <address>'		-Examine physical memory
!
! 'E/ID <address>'		-Examine ID bus register
!
! 'E <address>'			-Examine WCS location, display all fields
!
! 'E <address> <fieldname-1>,<fieldname-2>,,,,<fieldname-n>
!				examine WCS location, display only the
!				fields specified.
!	NOTE: <fieldnames> =	ACF,ACM,ADS,ALU,BEN,BMX,CCK,CID,DK,DT,EAL
!				EBM,FEK,FS,IBC,IEK,UJM,KMX,MCT,MSC,PCK,QK
!				RMX,SCK,SGN,SHF,SI,SMX,SPO,USU,VAK
!
! 'E RA <address>'		-Examine an RA register
!
! 'E RC <address>'		-Examine an RC register
!
! 'E <symbolic-name>'		-Examine one of the symbolically named
!				 registers
!	NOTE: <symbolic-names> = DR,FER,IBA,LA,LB,LC,Q,RL,SC,SR,UPC
!
! 'D/P <address> <data>'	-Deposit <data> to physical memory
!
! 'D/ID <address> <data>'	-Deposit <data> to ID bus register
!
! 'D <address> <fieldname-1> <data-1>,<fieldname-2> <data-2>,........
!				-Deposit to WCS location, putting <data-1>
!				 into <fieldname-1>, etc. unspecified fields
!				 are unchanged.
!	NOTE: the '/z' qualifier may be used to cause all unspecified
!	      fields to be cleared.
!
! 'D RA <address> <data>'	-Deposit <data> to an RA register
!
! 'D RC <address> <data>'	-Deposit <data> to an RC register
!
! 'D <symbolic-name> <data>'	-Deposit <data> to one of the symbolically
!				 named registers (see list above).
!	NOTE: Deposits to the RLOG stack (RL) are not supported.
!
! 'CONTINUE'			-Resume micro-instruction execution as
!				 specified by contents of micro-PC(UPC)
!
! 'START <address>'		-Start micro-sequencer at <address>.
!
! 'HALT'			-Halt the micro-sequencer
!
! 'SET SOMM'			-Set the 'STOP ON MICRO-MATCH' enable
!
! 'CLEAR SOMM'			-Clear the 'STOP ON MICRO-MATCH' enable
!
! 'SET STEP'			-Enable single micro-instruction step mode.
!				 start or continue will allow one micro-
!				 instruction to execute, then halt the
!				 micro-sequencer.
!
! 'CLEAR STEP'			-Disable single micro-instruction step mode.
!
! 'OPEN <filename>'		-Open specified file on floppy drive 0
!
! 'OPEN DX1:<filename>'		-Open specified file on floppy drive 1
!	NOTE:	'OPEN' is used to specify a file containing the micro-code
!		currently loaded in the WCS portion of the control store.
!		(addresses 1000(16) & up in the control store)
!		this file will be used for all examines of the WCS,
!		since the WCS is not directly readable.
!
! 'RETURN'			-Return to the console program. 
!			      +------------------------------------------+
!			      !      Do NOT use the RETURN command       !
!			      !    unless the console floppy is in CS1.  !
!			      +------------------------------------------+
!			      ! To return to the console program, remove !
!			      ! the WCS debug floppy, insert the console !
!			      !     floppy, then type 'RETURN <CR>'.     !
!			      +------------------------------------------+
!
!<END-OF-WCSMON.HLP>
