!	Fermilab Accelerator VAX's Bootstrap Help File - FERMI.HLP
!	Created 05-Mar-1983, F. J. Nagy
!
! The bootstrap files for the Fermilab Accelerator VAX's use a slightly
! different naming scheme from DEC's normal names.  The standard boot
! files have names of the form "tcuBOO.CMD" and are invoked by either
! of the Console commands "BOOT tcu" or "@tcuBOO.CMD".
!
! "t" indicates the type of executive being booted.  The defined types
! are:
!	V - boot executive from specified disk ([SYS0.] root directory).
!	    (normally the executive is VAX/VMS, sometimes is Sta. BACKUP).
!	B - boot Standalone BACKUP from [SYSE.] root directory on disk.
!	S - boot Diagnostic Supervisor from [SYS0.] on specified disk.
!
! "c" indicates the MassBus controller:
!
!	A - first Massbus controller (drive names DRAu:)
!	B - second Massbus controller (drive names DRBu:)
!
! "u" indicates the disk drive unit number on the controller (0,1,2...).
!
! The system is normally resident on either "DRA0:" or "DRB0".  The
! commands to boot VMS from these disks are then "BOOT VA0" or "BOOT VB0".
!
! DEFBOO.CMD (the "BOOT" command with no device) will boot the system
! from the "default" drive, either "DRA0:" or "DRB0:".  BCKBOO.CMD or
! "BOOT BCK" will boot Standalone BACKUP from the same system disk.
! The command "@FLOPID" will print a help file identifying the console
! floppy disk and which are the "default" boot devices established on
! this console floppy.
!
! DLuBOO.CMD (or "BOOT DLu") will boot Standalone BACKUP from an RL02
! disk on drive "u" (0,1, or 2).  CS1BOO.CMD (or "BOOT CS1") will boot
! Standalone BACKUP from the Console media.
!
! Standalone BACKUP is booted with a "VcuBOO.CMD" file from the KITS RM03.
!
! The "tcuGEN." files will boot the executive (VAX/VMS) stopping in SYSBOOT
! to allow modification of the parameters.  The "tcuXDT." will first stop
! in SYSBOOT and then at an XDELTA breakpoint in EXEC (XDELTA is loaded
! with the system).
!
