!VAX-11/780 Console help file	REV. 8F	 06-Mar-1983 Frank J. Nagy
!
!To stop printing, type ^C
!
!For abbreviation rules, type '@ABBREV.HLP'.
!For error message help, type '@ERROR.HLP'.
!For remote access help, type '@REMOTE.HLP'.
!To identify floppy, type '@FLOPID'.
!For boot file help, type '@FERMI.HLP'.
!
!For detailed bootstrap command file information, type '@BOOT.HLP'.
!For WCS micro-debugger help, type '@WCSMON.HLP'.
!
!Syntax:   All commands are terminated by carriage return.
!
!	'EXAMINE' and 'DEPOSIT' <qual> switches for address space :
!		'/P'  = physical memory(the default)
!		'/V'  = virtual memory
!		'/I'  = internal(processor) registers
!		'/G'  = general registers 0 thru F(R0 thru PC)
!		'/VB' = VBUS registers
!		'/ID' = ID bus registers
!	'EXAMINE' and 'DEPOSIT' <QUAL> switches for data-length :
!		'/B'  = byte (8 bits)
!		'/W'  = word (2 bytes)
!		'/L'  = longword (2 words)
!		'/Q'  = quadword (4 words)
!	<addr> is a <number>, or one of the following symbolic address
!		'R0,R1,R2,......,R11,AP,FP,SP,PC'  (general registers)
!		'PSL' = Processor Status Word
!		'*'   = last address
!		'+'   = address following 'last'(*) address
!		'-'   = address preceeding 'last'(*) address
!		'@'   = uses last EXAMINE/DEPOSIT data for address
!	<number> = string of digits in current default radix,
!	or string of digits prefixed with a default radix
!	override (%O for octal, %X for hex).
!
!'BOOT'					-Boots the CPU from default device
!'BOOT <devnam>'			-Takes the first three alphanumeric
!					 chars of <devnam>, and executes the
!					 indirect file '<devnam>BOO.CMD'
!'CLEAR STEP'				-Enable normal (no step) mode
!'CLEAR SOMM'				-Clear 'STOP ON MICRO-MATCH' enable.
!					 NOTE: ID register 21 is the
!					 micro-match register.
!'CONTINUE'				-Issues a continue to the ISP
!'DEPOSIT[/<switch(es)>] <addr> <data>'	-Deposit <data> to <address>
!'ENABLE DX1:'				-Enables console software to access
!					 floppy drive 1 on those systems with
!					 dual floppies.
!'EXAMINE[/<switch(es)>] <addr>'	-Display contents of <address>
!'EXAMINE IR'				-Examine Instruction reg(IR). Displays
!					 op-code, specifier, execution point
!					 counter
!'HALT'					-Halts the ISP
!'HELP'					-Prints this file
!'INITIALIZE'				-Initializes the CPU
!'LINK'					-Causes console to begin command
!					 linking. console prints reversed
!					 prompt to indicate linking. all
!					 commands typed by user while linking
!					 are stored in an indirect command
!					 file for later execution. Control-C
!					 terminates linking. (see PERFORM)
!
!
!'LOAD[/START:<addr>] <filename>'	-Load file to main memory, starting at
!					 address 0, or <addr> if specified
!'LOAD/WCS <filename>'			-Load file specified to WCS
!'NEXT <number>'			-<number> step cycles are done, type
!					 of step depends on last 'SET STEP'
!					 command
!'PERFORM'				-Execute a file of linked commands
!					 previously generated via a 'LINK'
!					 command.
!'QCLEAR <address>'			-Does a quad clear to <address>,which
!					 is forced to a quad word boundary.
!					 (clears ECC errors)
!'REBOOT'				-Causes a console software reload
!'REPEAT <any-console-command>' 	-Causes the console to repeatedly
!					 execute the <console-command>, until
!					 stopped by a Control-C (^C).
!'SET CLOCK SLOW'			-Set CPU clock freq to slow.
!'SET CLOCK FAST'			-Set CPU clock freq to fast
!'SET CLOCK NORMAL'			-Set CPU clock freq to normal
!'SET DEFAULT <option>[,...,<option>]'	-Set console defaults
!					note: <options> are:
!					OCTAL,HEX,PHYSICAL,VIRTUAL,INTERNAL
!					GENERAL,VBUS,IDBUS,BYTE,WORD,LONG,QUAD
!'SET RELOCATION:<number>'		-Put <number> into console relocation
!					 register. relocation register is
!					 added to effective address of
!					 physical and virtual examines and
!					 deposits.
!'SET SOMM'				-Set 'STOP ON MICRO-MATCH' enable
!'SET STEP BUS'				-Enable single bus cycle clock mode
!'SET STEP INSTRUCTION'			-Enables single instruction mode
!'SET STEP STATE'			-Enable single time state clock mode
!'SET TERMINAL FILL:<number>'		-Set fill count for # of blanks
!					 written to the terminal after <CRLF>
!'SET TERMINAL PROGRAM'			-Put console terminal into 'PROGRAM
!					 I/O' mode
!'SHOW'					-Shows console and CPU state
!'SHOW VERSION'				-Shows versions of microcode and
!					 console
!'START <address>'			-Initializes the CPU,deposits<address>
!					 to PC, issues a continue to the ISP.
!'TEST'					-Runs micro-diagnostics
!'TEST/COM'				-Loads micro-diagnostics, awaits
!					 commands
!'UNJAM'				-Unjams the SBI
!'WCS'					-Calls micro-debugger. WCS micro-
!					 debugger floppy must be inserted 
!					 in CS1. else, "FILE NOT FOUND" error.
!					 (For debugger help, insert WCS debug
!					 floppy, then type '@WCSMON.HLP')
!'WAIT DONE'				-When executed from an indirect
!					 command file, this command will cause
!					 command file execution to stop until:
!					   a) a 'done' signal is received from
!					      the program running in the VAX
!					      (command file execution will
!					      continue), or
!					   b) the VAX-11/780 halts, or oper-
!					      ator types a Control-C (^C :
!					      command file execution will
!					      terminate).
!'^P'(Control-P)			-Put console terminal into 'CONSOLE
!					 I/O' mode
!					 (Unless mode switch in 'DISABLE')
!'@<filename>'				-Process an indirect command file
!
!<END OF 'CONSOL.HLP'>
