! Editted by Frank J. Nagy, Fermilab Accelerator Controls, 22-Mar-83
1 RESEQ
 RESEQ is a program to resequence Fortran programs.  Any program or
 routine to be resequenced is assumed to be syntactically correct
 and have no undefined statement labels.

 The format for the command line is:

	RESEQ  output-file=input-file/switches

 where 'output-file' and 'input-file' are any valid VAX/VMS file
 specification and '/switches' are any of the valid qualifiers.
 The RESEQ command must be defined as a foreign command via:

	RESEQ :== $FERMI$EXE:RESEQ
2 Qualifiers
/FORMAT=n
 This switch specifies that FORMAT statements are to  be
 resequenced independently of other statements, and that
 the first FORMAT statement will have the label 'n'.
/INCREMENT=n
 This switch specifies  the  increment  to  use  between
 labels  (both  FORMAT statements and any other statements
 which have labels).
/LIST
 This switch indicates that a listing of the resequenced
 program  is  to be put in the file "newfile.LIS".  This
 may be used with /SYMBOLS.
/STATEMENT=n
 This switch specifies the first label to be  used  when
 resequencing the program or routine.  If /FORMAT is not
 used, FORMAT statements will be resequenced in sequence
 with any other statement which has a label.
/SYMBOLS
 This switch indicates that the symbol  table  (the  old
 label  and  the  new  label  that replaces it) is to be
 written to the file "newfile.LIS".  This  may  be  used
 with /LIST.
2 Limitations
 The file to be resequenced must not contain any sequence
 numbers in columns 73-80.

 No statement label references can be broken across
 continuation lines.  Thus statements of the form:

	GOTO 10
	1  10

 must be specified as

	GOTO 1010
