1 KEYBOARD
2 EDT
3 DIAGRAM
[4w[?3h[H[J)0
                               BORG-WARNER RESEARCH CENTER                                lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqk
                       KEYBOARD EXTENSIONS TO THE EDT KEYPAD EDITOR
[3;91Hx[7m UP ^   [mx[7m DOWN v [mx LEFT < x RIGHT >x
                                                                                          x LAST   x NEXT   x        x        x
                                                                                          x SCREEN x SCREEN x        x        x
lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqu
x   !    x   @    x   #    x   $    x   %    x[7m   ^    [mx   &    x   *    x   (    x   )    x   _    x   +    
[7;109Hx   ~    x[7m BAK SP [mx
x   1    x   2    x   3    x   4    x   5    x   6    x   7    x   8    x   9    x   0    x   -    x   =    x   `    x X-POSE x
x        x        x        x        x        x <CTRL> x        x        x        x        x        x        x        x CHARS  x
mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqnqqqqqqqqu
    x[7m Q      [mx[7m W      [mx[7m E      [mx[7m R      [mx[7m T      [m
[11;50Hx Y      x[7m U   ^U [mx[7m I   ^I [mx O      x[7m P      [mx[7m {    [ [mx[7m }    ] [mx    
[11;118Hx[7m DELETE [mx
    x QUIT   x TOGGLE x EXIT   x REPLACEx TOP    x        x USR FN1x INCLUDEx        x PASTE  x CH CASEx CH CASEx    x CLEAR  x
    x        x WIDTH  x        x GENERICx        x        x USR FN2x        x        x GENERICx <-WORD x WORD-> x    x GENERICx
    mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqj    tqqqqqqqqu
        x[7m A      [mx[7m S      [mx D      x[7m F   ^F [mx[7m G   ^G [mx[7m H      [m
[15;63Hx[7m J      [mx[7m K   ^K [mx[7m L   ^L [mx :    ; x "    ' x RETURN  x[7m |    \ [mx
        x APPEND x SUBST  x        x F GEN  x EXPLAINx KEYBRD x TOGGLE x F MARK x WRITE  x        x        x         xASCII   x
        x GENERICx GENERICx        x F LAST x KEYS   x DIAGRAMx SCROLL x P MARK x GENERICx        x        x         xNOKEYPADx
        mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqqqqqqqnqqqqqqqqu
            x[7m Z   ^Z [mx[7m X      [mx[7m C      [mx[7m V      [mx[7m B      [m
[19;58Hx[7m N      [mx[7m M   ^M [mx <    , x >    . x[7m ?    / [mx    SHIFT     x[7m LF     [mx
            x SELECT x COPY   x CUT    x VIEW   x SHOW   x TOGGLE x F MAIN x        x        xLN HELP x              x USER   x
            xKEY DEFSx GENERICx GENERICx BUFFER x BUFFERSx NUMBERSx F PASTEx        x        xNOK HELPx              x FUNCTN x
            mqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqqqqqqqvqqqqqqqqj
[23;1HUse GOLD G for help on a specific key.[K
3 KEYS

4 
The GOLD BACKSPACE key transposes the two characters preceeding the
current cursor location.

4 Q
The GOLD Q (QUIT) command leaves the editor without saving any text 
buffers.  This will cause you to lose any editing you have done in 
this session.

	See line mode QUIT for additional information

4 W
The GOLD W key toggles between 80/132 column screen widths.
(Requires VT100)

4 E
The GOLD E (EXIT) command leaves the editor.

	See line mode EXIT for additional information.

4 R 
The GOLD R (REPLACE) key deletes the select range and replaces it with
the contents of the specified buffer.

	See keypad Replace key for additional information

4 T	
The GOLD T (TOP) key positions the line containing the cursor at the
top of the screen.

4 U
The GOLD U and GOLD ^U invokes user defined macros. Macro buffers are
named USER_FUNCTION_1 and USER_FUNCTION_2 respectively.

4 I
The GOLD I (INCLUDE) command copies external files into specified
text buffers.  

The GOLD ^I (INCLUDE) command copies external files into the current
text buffer.

	See line mode INCLUDE for additional information.

4 P 
The GOLD P (PASTE) key inserts the contents of the specified buffer directly
in front of the cursor. 

	See keypad Paste key for additional information

4 {
The GOLD { key changes the case of the preceeding word, except for the
first character.

The GOLD [ key changes the case of the preceeding word, including the
first character.

The GOLD { key changes the case of the succeeding word, except for the
first character.

The GOLD ] key changes the case of the succeeding word, including the
first character.

4 [
The GOLD { key changes the case of the preceeding word, except for the
first character.

The GOLD [ key changes the case of the preceeding word, including the
first character.

The GOLD { key changes the case of the succeeding word, except for the
first character.

The GOLD ] key changes the case of the succeeding word, including the
first character.

4 }
The GOLD { key changes the case of the preceeding word, except for the
first character.

The GOLD [ key changes the case of the preceeding word, including the
first character.

The GOLD { key changes the case of the succeeding word, except for the
first character.

The GOLD ] key changes the case of the succeeding word, including the
first character.

4 ]
The GOLD { key changes the case of the preceeding word, except for the
first character.

The GOLD [ key changes the case of the preceeding word, including the
first character.

The GOLD { key changes the case of the succeeding word, except for the
first character.

The GOLD ] key changes the case of the succeeding word, including the
first character.

4 
The GOLD DELETE key clears the specified buffer.

	See line mode CLEAR for additional information

4 A
The GOLD A (APPEND) key deletes the selected range and adds it to the
end of the specified buffer. The selected range is all the text between
the selected position (see SELECT) and the current cursor position.
If no select has been done and the cursor is positioned on the current
search string, that string is appended.  

	See keypad Append key for additional information

4 S
The GOLD S (SUBSTITUTE) command replaces occurrences of one string
of characters with another.

	See line mode SUBSTITUTE for additional information.

4 F
The GOLD F (FIND) command places the cursor at the first line of
the specified buffer.

The GOLD ^F (FIND LAST) key returns to the last line in the most
recent text buffer before the current text buffer.

	See line mode FIND for additional information.

4 G
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 H
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 J
The GOLD J key switches between smooth scrolling and jump scrolling

4 K
The GOLD K key inserts the special file marker (~~/\~~).
The GOLD ^K key is used to locate and remove the file marker.

4 L
The GOLD L (WRITE) command creates a file from a specified buffer
 
The GOLD ^L (WRITE) command creates a file from the current buffer
 
	See line mode WRITE for additional information.

4 \
The GOLD \ command allows the input of a nokeypad command sequence
for execution. The Command is terminated by pressing the ENTER key
on the keypad.

THE GOLD | command displays an ASCII code chart

4 Z
The GOLD Z command allows the user to select a specific keyboard
definition.

     Available keyboards are:
         EDT - Extended EDT Editor Commands
         FOR - Fortran Code Commands
         DSR - Digital Standard Runoff Commands

The GOLD ^Z command allows the user to select a specific keypad
definitions.

     Available keypads are:
         EDT - EDT Keypad (resets numeric keypad)
         NOS - Numeric Keypad (for data entry)
         STD - Standard EDT Keypad (EDT default keypad)

4 X
The GOLD X (COPY) command copies text from one location to
a specified buffer.  When text is copied, the source text
remains intact.

	See line mode COPY for additional information.

4 C
The GOLD C (CUT) key deletes the select range, storing it in the specified
buffer. The select range is all the text between the selected position
(see SELECT) and the current cursor position.  If you have not selected a
range and the cursor is positioned on the current search  string, that
string is cut.  The previous contents of the specified buffer is lost. 

	See keypad Cut key for additional information

4 V
The GOLD V (TYPE) command displays the entire current buffer
on the terminal, the cursor position is not changed.

	See line mode TYPE for additional information.

4 B
The GOLD B (SHOW BUFFER) command lists the buffers being used
during the edit session, including the number of lines of text in each
buffer. The current  buffer is marked by an  equal sign (=) before
the name.  If an asterisk follows the number of lines, it indicates
that an input  file is connected to the buffer and that there are
more lines to be read from the file.  Thus, the line count is not
accurate.  

	See line mode SHOW BUFFER for additional information

4 N
The GOLD N key toggles between SET NUMBERS and SET NONUMBERS

	See line mode SET NUMBERS for additional information.

4 M
The GOLD M key sets the current buffer to the main buffer.

The GOLD ^M key sets the current buffer to the paste buffer.

	See line mode FIND for additional information.

4 ?
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.
3 SCROLL

4 SMOOTH
[1J[?4h

4 JUMP
[1J[?4l[0;24r

2 DSR
3 DIAGRAM
[?3h[H[J)0
                               BORG-WARNER RESEARCH CENTER                                lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqk
                       RUNOFF EXTENSIONS TO THE EDT KEYPAD EDITOR
[3;91Hx[7m UP ^   [mx[7m DOWN v [mx LEFT < x RIGHT >x
                                                                                          x LAST   x NEXT   x        x        x
                                                                                          x SCREEN x SCREEN x        x        x
lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqu
x   !    x   @    x   #    x   $    x   %    x   ^    x   &    x   *    x   (    x   )    x   _    x   +    
[7;109Hx   ~    x BAK SP x
x   1    x   2    x   3    x   4    x   5    x   6    x   7    x   8    x   9    x   0    x   -    x   =    x   `    x        x
x        x        x        x        x        x        x        x        x        x        x        x        x        x        x
mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqnqqqqqqqqu
    x[7m Q      [mx[7m W      [mx[7m E   ^E [mx R      x[7m T   ^T [m
[11;50Hx Y      x[7m U      [mx[7m I      [mx O      x[7m P   ^P [mx {   [7m [ [mx }   [7m ] [mx    
[11;118Hx DELETE x
    xQUIT EDTxTGL WDTHxEXIT EDTx        xTITLE   x        xUNDERLINxINDENT  x        xPARAGRPHxFIGURE  xFIGURE  x    x        x
    x        x        xENABLE  x        xHDR LVL x        x        x        x        xPAGE    x        xDEFERREDx    x        x
    mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqj    tqqqqqqqqu
        x[7m A      [mx[7m S      [mx[7m D   ^D [mx[7m F   ^F [mx[7m G   ^G [mx[7m H      [m
[15;63Hx[7m J   ^J [mx[7m K      [mx[7m L   ^L [mx :    ; x "    ' x RETURN  x |    \ x
        xAPPENDIXxSKIP    xDISPLAY xFOOTNOTExEXPLAIN xKEYBRD  xJUSTIFY xKEEP    xLAYOUT  x        x        x         x        x
        x        x        xDISABLE xEND FNT xKEYS    xDIAGRAM xNOJUST  x        x        x        x        x         x        x
        mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqqqqqqqnqqqqqqqqu
            x[7m Z   ^Z [mx[7m X      [mx[7m C      [mx[7m V      [mx[7m B   ^B [m
[19;58Hx[7m N   ^N [mx M      x[7m <  [m  , x[7m >  [m  . x[7m ? [m   / x    SHIFT     x LF     x
            xSELECT  xSPACING xCHAPTER xCENTER  xBLANK   xNOTE    x        xLEFT    xRIGHT   xDSR HELPx              x        x
            xKEY DEFSx        x        x        xBOLD    xEND NOTEx        xMARGIN  xMARGIN  x        x              x        x
            mqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqqqqqqqvqqqqqqqqj
[23;1HUse GOLD G for help on a specific key.[K
3 KEYS

4 Q
The GOLD Q (QUIT) command leaves the editor without saving any text 
buffers.  This will cause you to lose any editing you have done in 
this session.

	See line mode QUIT for additional information

4 E
The GOLD E (EXIT) command leaves the editor.

	See line mode EXIT for additional information.

4 G
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 H
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 Z
The GOLD Z command allows the user to select a specific keyboard
definition.

     Available keyboards are:
         EDT - Extended EDT Editor Commands
         FOR - Fortran Code Commands
         DSR - Digital Standard Runoff Commands

The GOLD ^Z command allows the user to select a specific keypad
definitions.

     Available keypads are:
         NOS - Numeric Keypad (for data entry)
         STD - Standard EDT Keypad

2 FORTRAN
3 DIAGRAM
[?3h[H[J)0
                               BORG-WARNER RESEARCH CENTER                                lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqk
                       FORTRAN EXTENSIONS TO THE EDT KEYPAD EDITOR
[3;91Hx UP ^   x DOWN v x LEFT < x RIGHT >x
                                                                                          x        x        x        x        x
                                                                                          x        x        x        x        x
lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqu
x   !    x   @    x   #    x   $    x   %    x   ^    x   &    x   *    x   (    x   )    x   _    x   +    
[7;109Hx   ~    x BAK SP x
x   1    x   2    x   3    x   4    x   5    x   6    x   7    x   8    x   9    x   0    x   -    x   =    x   `    x        x
x        x        x        x        x        x        x        x        x        x        x        x        x        x        x
mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqnqqqqqqqqu
    x[7m Q      [mx[7m W      [mx[7m E   ^E [mx[7m R   ^R [mx[7m T      [m
[11;50Hx Y      x U      x[7m I      [mx[7m O      [mx[7m P   ^P [mx {    [ x }    ] x    
[11;118Hx DELETE x
    xQUIT EDTxWRITE   xEXIT EDTxREAD    xTYPE    x        x        xINCLUDE xOPEN    xPROGRAM xOPEN    xCLOSE   x    x        x
    x        x        xENTRY   xRETURN  xIF TEST x        x        x        x        xPARAMTR x        x        x    x        x
    mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqj    tqqqqqqqqu
        x A      x[7m S      [mx[7m D   ^D [mx[7m F   ^F [mx[7m G   ^G [mx[7m H      [m
[15;63Hx J      x[7m K      [mx L      x :    ; x "    ' x RETURN  x |    \ x
        x        xSUBRUTNExDO LOOP xFORMAT  xEXPLAIN xKEYBRD  x        xCLOSE   x        x        x        x         x        x
        x        x        xDIMENSN xFUNCTIONxKEYS    xDIAGRAM x        x        x        x        x        x         x        x
        mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqqqqqqqnqqqqqqqqu
            x[7m Z   ^Z [mx[7m X   ^X [mx[7m C      [mx[7m V      [mx[7m B   ^B [m
[19;58Hx N      x M      x <    , x >    . x ?    / x    SHIFT     x LF     x
            xSELECT  xCONTINUExCALL    xDO WHILExBLOCK IFx        x        x        x        x        x              x        x
            xKEY DEFSx        x        x        xELSE IF x        x        x        x        x        x              x        x
            mqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqqqqqqqvqqqqqqqqj
[23;1HUse GOLD G for help on a specific key.[K
3 KEYS

4 Q
The GOLD Q (QUIT) command leaves the editor without saving any text 
buffers.  This will cause you to lose any editing you have done in 
this session.

	See line mode QUIT for additional information

4 E
The GOLD E (EXIT) command leaves the editor.

	See line mode EXIT for additional information.

4 G
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 H
Use the GOLD HELP key to display the basic keypad diagram.

Use the GOLD H key to display the extended keyboard diagram.

Use the GOLD G key to obtain help on a specific extend keyboard key.

Use the GOLD ^G to show the definition of a specified keyboard key.

Use the GOLD ? key to obtain help on a line mode command.

4 Z
The GOLD Z command allows the user to select a specific keyboard
definition.

     Available keyboards are:
         EDT - Extended EDT Editor Commands
         FOR - Fortran Code Commands
         DSR - Digital Standard Runoff Commands

The GOLD ^Z command allows the user to select a specific keypad
definitions.

     Available keypads are:
         NOS - Numeric Keypad (for data entry)
         STD - Standard EDT Keypad

2 ASCII_CODES
[?3h[H[J)0
                                                   BORG-WARNER RESEARCH CENTER
                                                    ASCII DECIMAL CODE CHART

 lqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqwqqqqqqqk
 x NUL  0x SOH  1x STX  2x ETX  3x EOT  4x ENQ  5x ACK  6x BEL  7x BS   8x HT   9x LF  10x VT  11x FF  12x CR  13x SO  14x SI  15x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x DLE 16x DC1 17x DC2 18x DC3 19x DC4 20x NAK 21x SYN 22x ETB 23x CAN 24x EM  25x SUB 26x ESC 27x FS  28x GS  29x RS  30x US  31x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x SP  32x !   33x "   34x #   35x $   36x %   37x &   38x '   39x (   40x )   41x *   42x +   43x ,   44x -   45x .   46x /   47x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x 0   48x 1   49x 2   50x 3   51x 4   52x 5   53x 6   54x 7   55x 8   56x 9   57x :   58x ;   59x <   60x =   61x >   62x ?   63x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x @   64x A   65x B   66x C   67x D   68x E   69x F   70x G   71x H   72x I   73x J   74x K   75x L   76x M   77x N   78x O   79x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x P   60x Q   81x R   82x S   83x T   84x U   85x V   86x W   87x X   88x Y   89x Z   90x [   91x \   92x ]   93x ^   94x _   95x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x `   96x a   97x b   98x c   99x d  100x e  101x f  102x g  103
[18;66Hx h  104x i  105x j  106x k  107x l  108x m  109x n  110x o  111x
 tqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqnqqqqqqqu
 x p  112x q  113x r  114x s  115x t  116x u  117x v  118x w  119
[20;66Hx x  120x y  121x z  122x {  123x |  124x }  125x ~  126x DEL127x
 mqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqvqqqqqqqj
[23H[K
2 VT100_CODES
[?3h[H[J)0
                                                   BORG-WARNER RESEARCH CENTER
                                                   VT100 ESCAPE SEQUENCE CHART


[23H[K
2 NOKEYPAD
3 DIAGRAM
[4w[?3h[H[J)0
                               BORG-WARNER RESEARCH CENTER                                lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqk
                       NOKEYPAD EXTENSIONS TO THE EDT KEYPAD EDITOR
[3;91Hx[7m UP ^   [mx[7m DOWN v [mx LEFT < x RIGHT >x
                                                                                          x LAST   x NEXT   x        x        x
                                                                                          x SCREEN x SCREEN x        x        x
lqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqwqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqnqqqqqqqqu
x   !    x   @    x   #    x   $    x   %    x[7m   ^    [mx   &    x   *    x   (    x   )    x   _    x   +    
[7;109Hx   ~    x[7m BAK SP [mx
x   1    x   2    x   3    x   4    x   5    x   6    x   7    x   8    x   9    x   0    x   -    x   =    x   `    x X-POSE x
x        x        x        x        x        x <CTRL> x        x        x        x        x        x        x        x CHARS  x
mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqnqqqqqqqqu
    x[7m Q      [mx[7m W      [mx[7m E      [mx[7m R      [mx[7m T      [m
[11;50Hx Y      x[7m U   ^U [mx[7m I   ^I [mx O      x[7m P      [mx[7m {    [ [mx[7m }    ] [mx    
[11;118Hx[7m DELETE [mx
    x QUIT   x WORD   x EXIT   x RANGE  x TOP    x        x        x INSERT x        x PAGE  x CH CASEx CH CASEx    x CLEAR  x
    x        x        x        x REPLACEx        x        x        x        x        x PASTE x <-WORD x WORD-> x    x GENERICx
    mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqj    tqqqqqqqqu
        x[7m A      [mx[7m S      [mx D      x[7m F   ^F [mx[7m G   ^G [mx[7m H      [m
[15;63Hx[7m J      [mx[7m K   ^K [mx[7m L   ^L [mx :    ; x "    ' x RETURN  x[7m |    \ [mx
        x        x SENTNCEx DELETE x FILL   x EXPLAINx KEYBRD x        x DEFINE x LINE   x        x        x         xASCII   x
        x APPEND x SUBST  x UNDEL  x        x KEYS   x DIAGRAMx        x KEY    x        x        x        x         xNOKEYPADx
        mqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqwqqqqvqqqqqqqqqnqqqqqqqqu
            x[7m Z   ^Z [mx[7m X      [mx[7m C      [mx[7m V      [mx[7m B      [m
[19;58Hx[7m N      [mx[7m M   ^M [mx <    , x >    . x[7m ?    / [mx    SHIFT     x[7m LF     [mx
            x SELECT x SEL RNGx CHAR   x VIEW   x BEGIN  x        x        x BACKUP x ADVANCExLN HELP x              x USER   x
            xKEY DEFSx        x CUT    x BUFFER x END    x        x        x        x        xNOK HELPx              x FUNCTN x
            mqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqvqqqqqqqqqqqqqqvqqqqqqqqj
[23;1HUse GOLD G for help on a specific key.[K
