USE OF RBOS (REMOTE BASIC OPERATING SYSTEM)

define a VMS DCL symbol thus:

	$ rbos :== @gglib:rbos

and then you can type:

	$ rbos

as a command.  It immediately puts you into local basic mode (you
get the OK prompt). You then can use the OLD, SAVE, and HOST commands.

(Note that running the RBOS.EXE file, without using the RBOS.COM file
will fail to work!  The com file sets necessary terminal parameters.)


OLD

Use the GIGI basic command:

	OLD "filespec"

to get a basic program from the host to GIGI.


SAVE

Use the GIGI basic command:

	SAVE "filespec"

to save a GIGI basic program in a file on the host.

(The default file type is ".GGB".  The double-quotes around the filespec
ARE necessary).


HOST

The HOST command (no arguments) just returns you to the control
of the host computer (GIGI basic is turned off).
You should re-issue the RBOS command to return to GIGI basic.

