1 _namelist
List-directed, symbolic I/O for FORTRAN programs.
 
Replace the FORTRAN namelist statements:
   NAMELIST / list / v1, ..., vi, vj, ...
   READ  (unit,list)
   WRITE (unit,list)
by the CALLs:
   CALL NAM$LIST  ('list','v1',%DESCR(v1),...,'vi',%DESCR(vi))
   CALL NAM$CONT  ('vj',%DESCR(vj), ... )
   CALL NAM$READ  (unit,'list')
   CALL NAM$WRITE (unit,'list')
LINK by including SYS$LIBRARY:LOCALIB/LIB
 
Additional info and restrictions in [MANAGER]]NAMELIST.TXT
Current version: 0.6, 20-JUL-1979.  Latest mods: string data; END/ERR opts
NOTE:: Because of compiler optimization routines that use NAM$READ
        & NAM$WRITE should either have namelist variables in common
        or compile the routine with the FORTRAN parameter /NOOPTIMIZE.
